/**
Source Server Version: 8.0.31
Source Database: backendsys
Date: 2023/05/23 17:09:22
*/

DROP TABLE IF EXISTS `sys_common`;
CREATE TABLE `sys_common` (
    PRIMARY KEY (`id`),
    `id` BIGINT NOT NULL COMMENT 'ID',
    `name` VARCHAR(100) NOT NULL COMMENT '配置名称',
    `value` TEXT COMMENT '配置值',
    `value_type` VARCHAR(20) DEFAULT 'text' COMMENT '配置值类型 (Text, Textarea, Number, Radio, Checkbox, Select)',
    `value_option` TEXT COMMENT '配置值选项 (除文本框外必填)',
    `tag` VARCHAR(20) NOT NULL COMMENT '标识',
    `sort` INT DEFAULT '1' COMMENT '排序',
    `create_time` DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间'
) ENGINE=INNODB AUTO_INCREMENT=1 DEFAULT CHARSET=utf8mb4 COMMENT='系统配置表';

INSERT INTO sys_common(id, name, value, value_type, value_option, tag, sort) VALUES
    (1, '单文件上传大小限制(MB)', 100, 'Number', null, 'upload', 1)
;